Title: TEDS-UM-Partie2
Course: UE Teds Modèle 2024

Q: TEDS part 2 q1 (6,214)
- 10 miles
- 8.332 miles
- 6.214 miles
- 16.093 miles
A: 6.214 miles

Q: TEDS part 2 q2 (40,225)
- 32.842 km
- 40.225 km
- 15.538 km
- 28.343 km
A: 40.225 km